FBHF╞'_ Alchemy Systems Demo Shell ▄  
  ▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀
   ( ESC key  or ALT F3 = Quit )
ÿWelcome to Alchemy Systems.  This is a shell program that allows you to run the Demo Programs and to read the Text file instructions. Use the cursor control keys to scroll these instructions. The upper menu is accessed by pressing the F10 function key. Once you get to the upper menu, Press the enter key. Use the cursor keys ie the Arrow Keys to move to the various selections. The Demos are run from the sub-menu under the menu heading DEMO. The Text files are accessed by going to the INSTRUCTION menu and activating the Open file portion of the sub menu. The F1 function key will bring up context sensitive help through out this Demo shell program. Move the cursor or Tab to the colored word in this help screen and press enter to bring up help on these items. It is recommend that you use the file viewer under the Instructions Menu Item to read the basic instructions for the Mixer, Gasmixer and Network programs. ö╥┘µ'/    Demo   ▄   ( ESC key = Quit )
  ▀▀▀▀▀▀▀▀▀▀
»Press enter to examine the Demos for the Mixer GasMixer and Pipe Network programs. The press the down arrows to select the Demo you wish to review, followed by the enter key. !
About, Mixer, GasMixer, Network I
If you press the left Arrow key you will move to the Instructions Menu. ατε°6'3 File viewer ▄   ( ESC key = Quit )
  ▀▀▀▀▀▀▀▀▀▀▀▀
òA file viewer views the contents of a text file. You can use the arrow keys to move about in the file. A file is loaded via the File│Open menu item. é
  Up         Move up one line
  Down       Move down one line
  Right      Move right one column
  Left       Move left one column
  PgUp       Move one page up
  PgDn       Move one page down
  Home       View right most column of the file
  End        View left most column of the file
  Ctrl-PgUp  View top of file
  Ctrl-PgDn  View bottom of file.
  Alt-F3     Close Viewer Window
┤	'W Mixer  ▄     ( ESC key = Quit )
  ▀▀▀▀▀▀▀
 Press the Enter key to run the Mixer Demo.
■
Once the Mixer demo is running you should first type the Letter L on the menu screen followed by pressing the enter key. This will bring up a selection screen of example problem to examine. Select the file to load by using the arrow keys to move the cursor over the file and then press the enter key. Once the file is loaded then you can select the other menu options. Enter V to examine the vessel sizing screen, or A to examine the Agitator results. You leave a screen by pressing the A key (for Accept).  This will return you to the main menu.  You exit the mixer program by holding down the Alt key and then pressing the Q key. This will return you to this Demo shell program. Read the Text File called Mixer.Txt in the instructions to understand this program. '` GasMixer   ▄   ( ESC key = Quit )
  ▀▀▀▀▀▀▀▀▀▀▀
 Press the Enter key to run the Gasmixer Demo.
¢
Once the Gas Mixer demo is running you should first type the number 6 on the menu screen followed by pressing the enter key. This will bring up an example problem to examine. Select the file to load by using the arrow keys to move the cursor over the file and then press the enter key. Once the file is loaded then you can select the other menu options Enter 1 to examine the vessel sizing screen, or 4 to examine the Agitator results.  You leave a screen by pressing the A key (for Accept).  This will return you to the main menu. You exit the mixer program by holding down the Alt key and then pressing the Q key.  This will return you to this Demo shell program. 'g Pipe Network ▄  ( ESC key = Quit )
  ▀▀▀▀▀▀▀▀▀▀▀▀▀
 Press the enter key to run the Pipe Network Demo.

Once the network menu is on you should press the F1 key for help instuctions. Press the F9 key followed by the F2 key to load an example problem. You must read the instructions file called Network.Txt to understand this program. The Demo will allow you to solve a simple network of your own design with 7 or less pipes.  The network program can solve complex pipe systems with thousand of pipes for both liquid and gas systems. It is sold with additional programs that solve single pipe problems for liquid, gas, and two phase flow. '.  About ▄        ( ESC key = Quit )
  ▀▀▀▀▀▀▀
`This just gives the mailing address for Alchemy System if you would like to order the programs. ┌
The Cost of the Programs is $800 for the Mixer Package. The Pipe sizing Package including all four programs is $400. There is also a linear programming package and a curve fitting utility that cost $100 dollars each. K
As a special offer All of the Programs can be purchased for $1000 dollars 
 To close the box, press Esc.
'C Instructions (Alt-S) ▄ ( ESC key = Quit )
  ▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀
EPress Enter to Open a file to read by using the File Open Menu item. à
The File menu offers choices for opening files, changing directories, and exiting the program. Use it to read the Demo Instructions 
 Open, Viewer
'; File Open  (F3) ▄   ( ESC key = Quit )
  ▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀
▌The Open command displays the Open a File dialog box. In this dialog box you select the text file you want browse in a file viewer. Press Enter then Use the Arrow Keys to Select The File to Read.  Then Press Enter Again. │'6 File│Exit ▄  (Alt-X) ( ESC key = Quit )
  ▀▀▀▀▀▀▀▀▀▀
`The Exit command terminates this program. Press ESC twice to close this screen and to NOT exit. 'c Single Phase Pipe Sizing Program ▄
  ▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀
        ( ESC key = Quit )
¿Press Enter to run the Single Phase Line Sizing Program. The Flow Rate is Fixed at 100 GPM on the Demo, but you can change other values, such as the Pipe Schedule etc. b
The is insufficient Room on this disk for the Two Phase Flow or the  Adiabatic Gas Flow program. '] Two Phase Pipe Sizing Program ▄
  ▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀
        ( ESC key = Quit )
ñThis program is not on the disk due to lack of space.  It performs Two Phase Flow Pipe pressure drop calculations using Lockhard Martinelli and Baker correlations. 'u Adiabatic Flow of Gas Pipe Sizing Program ▄
  ▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀
        ( ESC key = Quit )
╛This program is not on the disk due to lack of space.  It performs accurate Gas Pressure Drop calculations for both isothermal and Adiabatic Flow.  Accurate for High Pressure Drop Problems. '\ Help on Open a File Dialog Box ▄
  ▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀
     ( ESC key = Quit )
|The Open a File dialog box contains an input box, a file list, a file information panel, the standard button Cancel, one other action button Open:, plus a history list that's attached to the  inputbox. Press Enter at the *.TXT Prompt. Use Arrow Keys to Select the File to Read Then Press Enter and the View will come on. Remember to Press Alt-F3 to Exit the File View and Return. 'K Shaft Rating Program ▄
  ▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀
        ( ESC key = Quit )
⌠This program is not on the disk due to lack of space.  It performs calculations for the mixer shaft critical speed From user input values of agitator weights, Power Etc. This program is for use by mixing professionals and mechanical engineers. '#û⌠U\σ╠-╧KXù{                    